en	Invalid password: minimum length {0}.

en	Invalid password: maximum length {0}.

en	Invalid password: must contain at least {0} lower case characters.

en	Invalid password: must contain at least {0} numerical digits.

en	Invalid password: must contain at least {0} upper case characters.

en	Invalid password: must contain at least {0} special characters.

en	Invalid password: must not be equal to the username.

en	Invalid password: Can not contain the username.

en	Invalid password: must not be equal to the email.

en	Invalid password: fails to match regex pattern(s).

en	Invalid password: must not be equal to any of last {0} passwords.

en	Invalid password: password is blacklisted.

en	Invalid password: new password does not match password policies.

en	Edit Mode is mandatory

en	Custom configured LDAP filter does not start with "(" or does not end with ")".

en	Connection Timeout must be a number

en	Read Timeout must be a number

en	Client ID needs to be provided in config when Realm Roles Mapping is not used.

en	Not possible to preserve group inheritance and use UID membership type together.

en	Can not set write only when LDAP provider mode is not WRITABLE

en	Can not set write-only and read-only together

en	Can not enable both StartTLS and connection pooling.

en	Can not disable Importing users when LDAP provider mode is UNSYNCED

en	Groups path group does not exist - please create the group on specified path first

en	Validate Password Policy is applicable only with WRITABLE edit mode

en	Redirect URIs must not contain an URI fragment

en	Root URL must not contain an URL fragment

en	Root URL uses an illegal scheme

en	Base URL uses an illegal scheme

en	Backchannel logout URL uses an illegal scheme

en	A redirect URI uses an illegal scheme

en	Base URL is not a valid URL

en	Root URL is not a valid URL

en	A redirect URI is not a valid URI

en	Backchannel logout URL is not a valid URL

en	Client contained an invalid redirect URI.

en	Client redirect URIs must contain a valid host component.

en	Without a configured Sector Identifier URI, client redirect URIs must not contain multiple host components.

en	Malformed Sector Identifier URI.

en	Failed to get redirect URIs from the Sector Identifier URI.

en	Client redirect URIs does not match redirect URIs fetched from the Sector Identifier URI.

en	The "Use JWKS" switch and the switch "Use JWKS URL" cannot be ON at the same time.

en	Invalid value.

en	Please specify value.

en	Please specify value.

en	Attribute {0} must have a length between {1} and {2}.

en	Attribute {0} must have minimal length of {1}.

en	Attribute {0} must have maximal length of {2}.

en	Invalid email address.

en	Invalid number.

en	Attribute {0} must be a number between {1} and {2}.

en	Attribute {0} must have minimal value of {1}.

en	Attribute {0} must have maximal value of {2}.

en	Invalid value.

en	Invalid URL.

en	Invalid URL scheme.

en	Invalid URL fragment.

en	Please specify attribute {0}.

en	Attribute {0} is invalid date.

en	Attribute {0} is read only.

en	{0} contains invalid character.

en	{0} contains invalid character.

en	Attribute {0} must have at least {1} and at most {2} value(s).